<template>
  <div style="height: 85vh">
    <iframe width="100%" height="100%" :src="src" frameborder="0" />
  </div>
</template>

<script>
export default {
  name: 'CEPTD',
  data () {
    return {
      src: 'http://localhost:5601/app/kibana#/dashboard/Suricata?_g=(refreshInterval%3A(pause%3A!t%2Cvalue%3A0)%2Ctime%3A(from%3Anow-15m%2Cto%3Anow))'
    }
  }
}
</script>

<style scoped>
</style>
